-- Fix double-encoded (CP1252→UTF-8) menu_name for pans/bolts entries
-- Root cause: these records were inserted through a connection that
-- misinterpreted UTF-8 bytes as CP1252, causing mojibake.

SET NAMES utf8mb4;
USE `muyu_wms`;

UPDATE `sys_menu` SET `menu_name` = '盘库存' WHERE `menu_id` = 'm_207' AND `path` = '/inventory/pans';
UPDATE `sys_menu` SET `menu_name` = '匹库存' WHERE `menu_id` = 'm_208' AND `path` = '/inventory/bolts';
